By: Wilson Wong

In reply to NIKHIL KUMAR.

It is stated in the article as “5.5-inch Full HD AMOLED screen”.

You can check out the specifications here:

https://www.asus.com/us/Phone/ZenFone-3-Zoom-ZE553KL/Tech-Specs/

Thanks for reading.